usdt游戏网

Home> Product> Cotton processing> Saw Gin Series>
MY199B-16 New Type High-efficiency Saw Gin
Designed output: 2000- 3000kg/h
Power: 107.25 kW
Lint quality: meet or better than the national standard of the same grade cotton.
Noise: ≤85dB(A)
Number of saw: 199 pcs
Diameter of saw: Φ406mm
Spacing between saws: 16mm
Diameter of brush cylinder: Φ450mm
Dimensions(L*W*H): 3676×4560×3558.5(mm)
Structural weight: 11000 kg
Message

Product details

1. The patent number ZL 2018 2 1064917.8. It is specially designed for enterprises pursuing high efficiency, and for machine harvested cotton.

2. New type cotton extracting and feeding structure, high impurity removal efficiency , continuous and even cotton feeding without flying dust.

3. New work chamber, high output and good quality.

4. Saws are originally imported from USA, high output, long service life and good ginning quality.

5. The new adjusting structure guarantees the free control of fiber leftover rate of ginned seeds .

6. Intelligent control ensures safe operation rate not less than 98%.

7. The machine adopts a variety of new technologies and materials, simple and reasonable structure, stable and reliable running and convenient maintenance .


Technical-economic Index

Designed Output

2000-3000kg/h

Power

107.25 kW

Lint quality

meet or better than the national standard of the same grade cotton.

Noise

≤85dB(A)


Parameters

Number of saws

199片/pcs

Diameter of saw

Φ406mm

Spacing between saws

16mm

Diameter of brush cylinder

Φ450mm

Dimensions(L*W*H)

3676×4560×3558.5(mm)

Structural weight

11000 kg

Recommended

TEL: +86-0531-58675811
Domestic: 0531-58675821
International: 0531-58675820
Service: 0531-58675822
Email:swan@56789555.com
Address:NO.99,East Road of Dawei Village,Tianqiao District,Jinan City,China
Copyright? 2021Shandong Swan Cotton Industrial Machinery Stock Co.,Ltd All Rights Reserved.
Top
【网站地图】【sitemap】
【网站地图】【sitemap】